-- Revert date and timestamps back to separate state.
-- There should be no reason to do this, but included for completeness-
-- This will re-add the 'date' column, but not set the proper date.
ALTER TABLE screenings
    ADD COLUMN date TYPE DATE NOT NULL,
    ALTER COLUMN start_time TYPE TIME,
    ALTER COLUMN end_time TYPE TIME;
