From 9ca97a6baf1e75c3ef4b69a993e6713b88c09e61 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Gon=C3=A7alo=20Silva?= <goncalossilva@gmail.com>
Date: Mon, 9 May 2011 23:46:07 +0100
Subject: fixed a typo in the guide

---
 railties/guides/source/performance_testing.textile | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'railties/guides/source/performance_testing.textile')

diff --git a/railties/guides/source/performance_testing.textile b/railties/guides/source/performance_testing.textile
index a515226b9a..bbf200e66f 100644
--- a/railties/guides/source/performance_testing.textile
+++ b/railties/guides/source/performance_testing.textile
@@ -339,8 +339,8 @@ In this example, the test would run 5 times and measure wall time and memory. Th
 Metrics and formats have different defaults depending on the interpreter in use.
 
 |_.Interpreter|_.Mode|_.Default metrics|_.Default formats|
-|/2.MRI/REE |Benchmarking|+:[:wall_time, :memory, :objects, :gc_runs, :gc_time]+|N/A|
-|Profiling   |+:[:process_time, :memory, :objects]+|+[:flat, :graph_html, :call_tree]+|
+|/2.MRI/REE |Benchmarking|+[:wall_time, :memory, :objects, :gc_runs, :gc_time]+|N/A|
+|Profiling   |+[:process_time, :memory, :objects]+|+[:flat, :graph_html, :call_tree]+|
 |/2.Rubinius|Benchmarking|+[:wall_time, :memory, :objects, :gc_runs, :gc_time]+|N/A|
 |Profiling   |+[:wall_time]+|+[:flat, :graph]+|
 |/2.JRuby   |Benchmarking|+[:wall_time, :user_time, :memory, :gc_runs, :gc_time]+|N/A|
-- 
cgit v1.2.3

