From cbacc9700e68d1ea3e6cc83b08226c3ddb104537 Mon Sep 17 00:00:00 2001
From: Trevor Turk <trevorturk@gmail.com>
Date: Tue, 24 Aug 2010 00:13:33 -0500
Subject: Note about how to exit the console in the Getting Started guide

---
 railties/guides/source/getting_started.textile | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'railties/guides/source/getting_started.textile')

diff --git a/railties/guides/source/getting_started.textile b/railties/guides/source/getting_started.textile
index e68a82e9db..c292daa915 100644
--- a/railties/guides/source/getting_started.textile
+++ b/railties/guides/source/getting_started.textile
@@ -488,6 +488,8 @@ After the console loads, you can use it to work with your application's models:
 
 This code shows creating a new +Post+ instance, attempting to save it and getting +false+ for a return value (indicating that the save failed), and inspecting the +errors+ of the post.
 
+When you're finished, type +exit+ and hit +return+ to exit the console.
+
 TIP: Unlike the development web server, the console does not automatically load your code afresh for each line. If you make changes to your models while the console is open, type +reload!+ at the console prompt to load them.
 
 h4. Listing All Posts
-- 
cgit v1.2.3

