From f03aa05cee96f0a0e09af0e9244a9cf9fcd1cf6f Mon Sep 17 00:00:00 2001
From: Ryan Bigg <radarlistener@gmail.com>
Date: Mon, 29 Nov 2010 11:46:15 +1100
Subject: Change coloriz_logging description to follow the standard for this
 guide

---
 railties/guides/source/configuring.textile | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'railties/guides/source/configuring.textile')

diff --git a/railties/guides/source/configuring.textile b/railties/guides/source/configuring.textile
index b87bd429de..214674ef36 100644
--- a/railties/guides/source/configuring.textile
+++ b/railties/guides/source/configuring.textile
@@ -59,7 +59,8 @@ h4. Rails General Configuration
 
 * +config.cache_store+ configures which cache store to use for Rails caching. Options include +:memory_store+, +:file_store+, +:mem_cache_store+ or the name of your own custom class.
 
-* +config.colorize_logging+ (true by default) specifies whether or not to use ANSI color codes when logging information.
+* +config.colorize_logging+ specifies whether or not to use ANSI color codes when logging information. Defaults to _true_.
+
 
 * +config.dependency_loading+ enables or disables dependency loading during the request cycle. Setting dependency_loading to _true_ will allow new classes to be loaded during a request and setting it to _false_ will disable this behavior. Can also be enabled with +threadsafe!+.
 
-- 
cgit v1.2.3

