From 73324fd830723022178fe87e42e081442846145b Mon Sep 17 00:00:00 2001
From: Xavier Noria <fxn@hashref.com>
Date: Wed, 7 Mar 2012 22:46:06 +0100
Subject: Revert "updates the new default pool size in some additional places"

Reason: We are about to temporarily revert the change to the default.

This reverts commit 5c0aba238c37a71fce08f949bc2c6bdd9aab4f7b.
---
 railties/guides/source/command_line.textile | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'railties/guides/source/command_line.textile')

diff --git a/railties/guides/source/command_line.textile b/railties/guides/source/command_line.textile
index 8ae8c61ae6..fe4a84dae9 100644
--- a/railties/guides/source/command_line.textile
+++ b/railties/guides/source/command_line.textile
@@ -521,9 +521,7 @@ development:
   adapter: postgresql
   encoding: unicode
   database: gitapp_development
-  # Maximum number of database connections available per process. Please
-  # increase this number in multithreaded applications.
-  pool: 1
+  pool: 5
   username: gitapp
   password:
 ...
-- 
cgit v1.2.3

