From 493cf44682c19bd69eb2463d260c3bf29c7a23d7 Mon Sep 17 00:00:00 2001
From: Sergey Parizhskiy <parizhskiy@gmail.com>
Date: Mon, 28 Nov 2011 17:33:01 +0200
Subject: completed documentation for the rails server command

---
 railties/guides/source/command_line.textile | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'railties/guides/source/command_line.textile')

diff --git a/railties/guides/source/command_line.textile b/railties/guides/source/command_line.textile
index 3f8643eca3..a26a139baf 100644
--- a/railties/guides/source/command_line.textile
+++ b/railties/guides/source/command_line.textile
@@ -81,6 +81,8 @@ The server can be run on a different port using the +-p+ option. The default dev
 $ rails server -e production -p 4000
 </shell>
 
+The +-b+ option binds Rails to the specified ip, by default it is 0.0.0.0. You can run a server as a daemon by passing a +-d+ option. Use +-h+ or +--help+ option to get a list of all possible options that can be passed to the +rails server+ command.
+
 h4. +rails generate+
 
 The +rails generate+ command uses templates to create a whole lot of things. Running +rails generate+ by itself gives a list of available generators:
-- 
cgit v1.2.3

