From dad7fdc5734a3813246f238ac5760b2076932216 Mon Sep 17 00:00:00 2001
From: Santiago Pastorino <santiago@wyeworks.com>
Date: Mon, 2 Jan 2012 18:49:18 -0200
Subject: Rails::Plugin has gone

---
 railties/guides/source/api_documentation_guidelines.textile | 7 -------
 1 file changed, 7 deletions(-)

(limited to 'railties/guides/source/api_documentation_guidelines.textile')

diff --git a/railties/guides/source/api_documentation_guidelines.textile b/railties/guides/source/api_documentation_guidelines.textile
index 99eb668513..93120c15a7 100644
--- a/railties/guides/source/api_documentation_guidelines.textile
+++ b/railties/guides/source/api_documentation_guidelines.textile
@@ -134,13 +134,6 @@ h4. Regular Font
 
 When "true" and "false" are English words rather than Ruby keywords use a regular font:
 
-<ruby>
-# If <tt>reload_plugins?</tt> is false, add this to your plugin's <tt>init.rb</tt>
-# to make it reloadable:
-#
-#   Dependencies.load_once_paths.delete lib_path
-</ruby>
-
 h3. Description Lists
 
 In lists of options, parameters, etc. use a hyphen between the item and its description (reads better than a colon because normally options are symbols):
-- 
cgit v1.2.3

