From 544a10e428cda02e7baa38586ef266daaef20d89 Mon Sep 17 00:00:00 2001
From: Mike Manewitz <mike.manewitz@gmail.com>
Date: Fri, 4 May 2012 10:24:56 -0500
Subject: Editing log levels to reflect this doc:
 http://api.rubyonrails.org/classes/ActiveSupport/BufferedLogger/Severity.html

---
 guides/source/debugging_rails_applications.textile | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'guides/source/debugging_rails_applications.textile')

diff --git a/guides/source/debugging_rails_applications.textile b/guides/source/debugging_rails_applications.textile
index 903ed59e7b..45fa4ada78 100644
--- a/guides/source/debugging_rails_applications.textile
+++ b/guides/source/debugging_rails_applications.textile
@@ -124,7 +124,7 @@ h4. Log Levels
 
 When something is logged it's printed into the corresponding log if the log level of the message is equal or higher than the configured log level. If you want to know the current log level you can call the +Rails.logger.level+ method.
 
-The available log levels are: +:debug+, +:info+, +:warn+, +:error+, and +:fatal+, corresponding to the log level numbers from 0 up to 4 respectively. To change the default log level, use
+The available log levels are: +:debug+, +:info+, +:warn+, +:error+, +:fatal+, and +:unknown+, corresponding to the log level numbers from 0 up to 5 respectively. To change the default log level, use
 
 <ruby>
 config.log_level = :warn # In any environment initializer, or
-- 
cgit v1.2.3

