From a9bb1364b599a6f5196dd0132dfe5a941a7649e1 Mon Sep 17 00:00:00 2001
From: Chris Adams <wave@chrisadams.me.uk>
Date: Fri, 29 Jun 2012 00:08:43 +0100
Subject: Rails now uses the ActiveSupport BufferedLogger class

Instead of the standard Ruby logger
---
 guides/source/debugging_rails_applications.textile | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'guides/source/debugging_rails_applications.textile')

diff --git a/guides/source/debugging_rails_applications.textile b/guides/source/debugging_rails_applications.textile
index 0802a2db26..cc172042e9 100644
--- a/guides/source/debugging_rails_applications.textile
+++ b/guides/source/debugging_rails_applications.textile
@@ -102,7 +102,7 @@ It can also be useful to save information to log files at runtime. Rails maintai
 
 h4. What is the Logger?
 
-Rails makes use of Ruby's standard +logger+ to write log information. You can also substitute another logger such as +Log4r+ if you wish.
+Rails makes use of the +ActiveSupport::BufferedLogger+ class to write log information. You can also substitute another logger such as +Log4r+ if you wish.
 
 You can specify an alternative logger in your +environment.rb+ or any environment file:
 
-- 
cgit v1.2.3

