From 50b1399b3128fcba73bf3478e22d187090921872 Mon Sep 17 00:00:00 2001
From: Vijay Dev <vijaydev.cse@gmail.com>
Date: Sat, 28 Apr 2012 00:36:14 +0530
Subject: update docs - disabling prepared statements is not connected to
 managing connections externally [ci skip]

---
 guides/source/configuring.textile | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'guides/source/configuring.textile')

diff --git a/guides/source/configuring.textile b/guides/source/configuring.textile
index 1541428af9..28c138c714 100644
--- a/guides/source/configuring.textile
+++ b/guides/source/configuring.textile
@@ -525,7 +525,8 @@ development:
   password:
 </yaml>
 
-If you use external connection pool manager, you can disable prepared statements in rails:
+Prepared Statements can be disabled thus:
+
 <yaml>
 production:
   adapter: postgresql
-- 
cgit v1.2.3

