From b6987b4287bb2492b8f4000bdef08b376aa5f265 Mon Sep 17 00:00:00 2001
From: redmatrix <git@macgirvin.com>
Date: Tue, 12 Jul 2016 13:15:20 -0700
Subject: the abconfig defaults weren't changed in the schema files when they
 were changed in the code

---
 install/schema_mysql.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'install/schema_mysql.sql')

diff --git a/install/schema_mysql.sql b/install/schema_mysql.sql
index d2a5ac85e..b43ead050 100644
--- a/install/schema_mysql.sql
+++ b/install/schema_mysql.sql
@@ -1,7 +1,7 @@
 
 CREATE TABLE IF NOT EXISTS `abconfig` (
   `id` int(10) unsigned NOT NULL AUTO_INCREMENT,
-  `chan` int(10) unsigned NOT NULL DEFAULT '',
+  `chan` int(10) unsigned NOT NULL DEFAULT '0',
   `xchan` char(255) NOT NULL DEFAULT '',
   `cat` char(255) NOT NULL DEFAULT '',
   `k` char(255) NOT NULL DEFAULT '',
-- 
cgit v1.2.3

