From 3919c8f79f9f104e99b161e9034c68eba3fe86a0 Mon Sep 17 00:00:00 2001
From: zotlabs <mike@macgirvin.com>
Date: Wed, 3 May 2017 18:50:32 -0700
Subject: abook_not_here flag created to indicate singleton connections which
 are connected to this channel but not on this hub. abook_instance enumerates
 which hubs the connections is valid, but we ultimately need something more
 efficiently searchable to decide what operations are supported w/r/t this
 connection in the context of this hub. This flag is ignored during sync to
 clones although the code to set it correctly during channel creation, import,
 and sync has not yet been implemented.

---
 install/schema_mysql.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'install/schema_mysql.sql')

diff --git a/install/schema_mysql.sql b/install/schema_mysql.sql
index b64c1ae61..602f7ac2f 100644
--- a/install/schema_mysql.sql
+++ b/install/schema_mysql.sql
@@ -34,6 +34,7 @@ CREATE TABLE IF NOT EXISTS `abook` (
   `abook_unconnected` tinyint(4) NOT NULL DEFAULT '0',
   `abook_self` tinyint(4) NOT NULL DEFAULT '0',
   `abook_feed` tinyint(4) NOT NULL DEFAULT '0',
+  `abook_not_here` tinyint(4) NOT NULL DEFAULT '0',
   `abook_profile` char(64) NOT NULL DEFAULT '',
   `abook_incl` TEXT NOT NULL DEFAULT '',
   `abook_excl` TEXT NOT NULL DEFAULT '',
@@ -58,6 +59,7 @@ CREATE TABLE IF NOT EXISTS `abook` (
   KEY `abook_pending` (`abook_pending`),
   KEY `abook_unconnected` (`abook_unconnected`),
   KEY `abook_self` (`abook_self`),
+  KEY `abook_not_here` (`abook_not_here`),
   KEY `abook_feed` (`abook_feed`)
 ) ENGINE=MyISAM  DEFAULT CHARSET=utf8;
 
-- 
cgit v1.2.3

