From 1acfc05e2db2ba5556b8d8596dcf7b3b99f75f6b Mon Sep 17 00:00:00 2001
From: Mario <mario@mariovavti.com>
Date: Mon, 14 Aug 2023 07:58:44 +0000
Subject: fix index name mixup

---
 install/schema_mysql.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'install/schema_mysql.sql')

diff --git a/install/schema_mysql.sql b/install/schema_mysql.sql
index 71a5c8f92..e342c4605 100644
--- a/install/schema_mysql.sql
+++ b/install/schema_mysql.sql
@@ -1627,6 +1627,6 @@ CREATE TABLE IF NOT EXISTS workerq (
 	workerq_cmd varchar(191) NOT NULL DEFAULT '',
 	KEY workerq_priority (workerq_priority),
 	KEY workerq_reservationid (workerq_reservationid),
-	KEY workerq_processtimeout (workerq_uuid),
-	KEY workerq_uuid (workerq_processtimeout)
+	KEY workerq_processtimeout (workerq_processtimeout),
+	KEY workerq_uuid (workerq_uuid)
 ) ENGINE = InnoDB DEFAULT CHARSET=utf8mb4;
-- 
cgit v1.2.3

