From 147d7f3bbf6c785f2c1eb7cdcfaa0a47e0ee43d3 Mon Sep 17 00:00:00 2001
From: Friendika <info@friendika.com>
Date: Sun, 6 Feb 2011 15:50:50 -0800
Subject: theme name cleanup - rename default to loozah, provide sane fallbacks
 and change system primary theme. Provide indication on contact edit page of
 last update success/failure - can be extended later to show actual timestamp
 of last successful update.

---
 database.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'database.sql')

diff --git a/database.sql b/database.sql
index 817fd0922..83e0e4b6f 100644
--- a/database.sql
+++ b/database.sql
@@ -77,6 +77,7 @@ CREATE TABLE IF NOT EXISTS `contact` (
   `subhub` tinyint(1) NOT NULL DEFAULT '0',
   `hub-verify` char(255) NOT NULL,
   `last-update` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
+  `success_update` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
   `name-date` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
   `uri-date` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
   `avatar-date` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
-- 
cgit v1.2.3

